test.DAT [2.50e+05; 1.25] NC-At5g22580, 13 February 2003, ph 6.6, 298 K, Varian600 (Vosges)

6.4 6.8 7.2 7.6 8.0 8.4 8.8 9.2 9.6 10.0

10.4

10.8

11.2

101.0

103.0

105.0

107.0

109.0

111.0

113.0

115.0

117.0

119.0

121.0

123.0

125.0

127.0

129.0

131.0

133.0

135.0