-180 -90 0 90 180

-180

-90

0

90

180

ψ

ϕ

HIS+ 14

LYS+ 113

LYS+ 111

ASP- 115

LYS+ 120

LYS+ 110

LYS+ 111

ASP- 115

LYS+ 117

MET 118

ASN 89 CYS 121

MET 118

LYS+ 120

GLU- 107

ASN 119 LYS+ 78

SER 88

LYS+ 113

ASP- 115

GLU- 56 ASN 89

LYS+ 111

MET 118 GLU- 56

GLU- 12 ASN 89 LYS+ 110

MET 118

CYS 121

LYS+ 78 LYS+ 111

CYS 121

GLU- 75

ASP- 115

MET 118

SER 88

ASN 119

ALA 11

GLU- 12

GLU- 56

LYS+ 78

LYS+ 78

LYS+ 120

CYS 121

ASN 15

LYS+ 111