-180 -90 0 90 180

-180

-90

0

90

180

ψ

ϕ

SER 100

SER 88

SER 100 TYR 87

SER 88

TYR 87

SER 88

ASN 38

ALA 39

TYR 87

GLU- 40

MET 98SER 88

ASN 38 TYR 87

SER 88

SER 88