-180 -90 0 90 180

-180

-90

0

90

180

ψ

ϕ

GLU- 85

ALA 96

TYR 87

ALA 96

SER 100

GLU- 91 VAL 84

MET 98

GLU- 91

SER 100

SER 83

SER 83

SER 100

TYR 101

ARG+ 94

TYR 87

MET 98 ALA 92

ALA 96

GLN 89

ARG+ 94

MET 98

SER 100