-1 11 10 9 8 7 6 5 4 3 2 1 0 ppm ppm

6.5 7.0 7.5 8.0 8.5 9.0 9.5 10.0

10.5

11.0 ppm

105

110

115

120

125

130

135

101404.b7cf/1 francis

1D NS=128 RG=128 T=25 hZnfinger soluble

JarID-8034

101404.b7cf/2 francis

HSQC NS=4 RG=256 T=25 hZnfinger soluble

JarID-8034

CESG MCW NMR screening