4.7 4.6 4.5 4.4 4.3 4.2 4.1 4.0 3.9 3.8 3.7 3.6

1H ppm

76.9

76.8

76.7

76.6

76.5

76.4

76.3

76.2

76.1

76.0

75.9

75.8

75.7

75.6

75.5

75.4

75.3

75.2

75.1

75.0

74.9

74.8

74.7

74.6

74.5

74.4

74.3

74.2

74.1

74.0

73.9

73.8

1 3 C p p m