6.3 6.2 6.1 6.0 5.9 5.8 5.7

1H ppm

6.16

6.15

6.14

6.13

6.12

6.11

6.10

6.09

6.08

6.07

6.06

6.05

6.04

6.03

6.02

6.01

6.00

5.99

5.98

5.97

5.96

5.95

5.94

5.93

5.92

5.91

5.90

5.89

1 H p p m