-180 -90 0 90 180

-180

-90

0

90

180

ψ

ϕ

ASP- 36

CYS 121

MET 118

ASP- 115

ASP- 36

LYS+ 120

LYS+ 117

LYS+ 55

LYS+ 111

ALA 37

LYS+ 110

SER 77

SER 88

GLU- 107

MET 118

ALA 11

GLU- 107 CYS 121

GLU- 107

LYS+ 111 ASP- 115 ASP- 36

ASP- 36GLU- 107

LYS+ 111 ALA 11

LYS+ 55

CYS 121