-180 -90 0 90 180

-180

-90

0

90

180

ψ

ϕ

MET 11

CYSS 50

HIS 3

LEU 9

MET 11

SER 13

HIS 4

GLU- 15

HIS 3

CYSS 50 CYSS 50

CYSS 50

MET 11

SER 13 CYSS 50 HIS 6

CYSS 50

CYSS 50