-180 -90 0 90 180

-180

-90

0

90

ψ

ϕ

GLU- 6

ASN 75 ASP- 89

ALA 2

ASN 75 ASN 75

ASN 75

ASP- 87

ARG+ 88

GLU- 6

ASN 75