refined_11_08.ps

Main-chain bond angles

refined_11

PROCHECK

Page 1

101 106 111 116 121 126 131 10 20 30 40 50 60 70 CA-C-N

(except Gly,Pro)

Frequency

101 106 111 116 121 126 131 10 20 30 40 50 60 70 CA-C-N

(Gly)

Frequency

101 106 111 116 121 126 131 10 20 30 40 50 60 70 CA-C-N

(Pro)

Frequency

108 113 118 123 128 133 138 10 20 30 40 50 60 70 O-C-N

(except Pro)

Frequency

107 112 117 122 127 132 137 10 20 30 40 50 60 70 O-C-N

(Pro)

Frequency

106 111 116 121 126 131 136 10 20 30 40 50 60 70 C-N-CA

(except Gly,Pro)

Frequency

105 110 115 120 125 130 135 10 20 30 40 50 60 70 C-N-CA

(Gly)

Frequency

107 112 117 122 127 132 137 10 20 30 40 50 60 70 C-N-CA

(Pro)

Frequency

105 110 115 120 125 130 135 10 20 30 40 50 60 70 CA-C-O

(except Gly)

Frequency

105 110 115 120 125 130 135 10 20 30 40 50 60 70 CA-C-O

(Gly)

Frequency

95 100 105 110 115 120 125 10 20 30 40 50 60 70 CB-CA-C

(Ala)

Frequency

94 99 104 109 114 119 124 10 20 30 40 50 60 70 CB-CA-C

(Ile,Thr,Val)

Frequency

Black bars > 2.0 st. devs. from mean.

Solid and dashed lines represent the mean and standard deviation values as per Engh & Huber small-molecule data.

refined_11_08.ps

Main-chain bond angles

refined_11

PROCHECK

Page 2

95 100 105 110 115 120 125 10 20 30 40 50 60 70 CB-CA-C

(the rest)

Frequency

96 101 106 111 116 121 126 10 20 30 40 50 60 70 N-CA-C

(except Gly,Pro)

Frequency

97 102 107 112 117 122 127 10 20 30 40 50 60 70 N-CA-C

(Gly)

Frequency

96 101 106 111 116 121 126 10 20 30 40 50 60 70 N-CA-C

(Pro)

Frequency

95 100 105 110 115 120 125 10 20 30 40 50 60 70 N-CA-CB

(Ala)

Frequency

96 101 106 111 116 121 126 10 20 30 40 50 60 70 N-CA-CB

(Ile,Thr,Val)

Frequency

88 93 98 103 108 113 118 10 20 30 40 50 60 70 N-CA-CB

(Pro)

Frequency

95 100 105 110 115 120 125 10 20 30 40 50 60 70 N-CA-CB

(the rest)

Frequency

Black bars > 2.0 st. devs. from mean.

Solid and dashed lines represent the mean and standard deviation values as per Engh & Huber small-molecule data.